 -0.100000000000000       0.100000000000000        1.00000000000000D-002
   5000.00000000000        6000.00000000000        7000.00000000000     
  -3000.00000000000        1.00000000000000D-003  -14.0000000000000     
  0.400000000000000        0.00000000000000D+000  -9.62376690000000     
   90.0000000000000        100.000000000000        0.00000000000000D+000
   0.00000000000000D+000   0.00000000000000D+000   1.00000000000000     
   1.00000000000000        1.00000000000000D-002   0.00000000000000D+000
   14.0000000000000      T           0 F           1
