EXOMOL.def                                                                      # ID
(28Si)(36S)                                                                     # IsoFormula
36S-28Si                                                                        # Iso-slug
UCTY                                                                            # Isotopologue dataset name
20180601                                                                        # Version number with format YYYYMMDD
DWFFKGPZNGKUPH-XKBLRHCCSA-N                                                     # Inchi key of molecule
2                                                                               # Number of atoms
36                                                                              # Isotope number 1
S                                                                               # Element symbol 1
28                                                                              # Isotope number 2
Si                                                                              # Element symbol 2
63.944007 1.06181520e-25                                                        # Isotopologue mass (Da) and (kg)
C                                                                               # Symmetry group
2                                                                               # Number of irreducible representations
1                                                                               # Irreducible representation ID
Sigma+                                                                          # Irreducible representation label
1                                                                               # Nuclear spin degeneracy
2                                                                               # Irreducible representation ID
Sigma-                                                                          # Irreducible representation label
1                                                                               # Nuclear spin degeneracy
 5000.00                                                                        # Maximum temperature of linelist
0                                                                               # No. of pressure broadeners available
0                                                                               # Dipole availability (1=yes, 0=no)
0                                                                               # No. of cross section files available
0                                                                               # No. of k-coefficient files available
0                                                                               # Lifetime availability (1=yes, 0=no)
0                                                                               # Lande g-factor availability (1=yes, 0=no)
10423                                                                           # No. of states in .states file
1                                                                               # No. of quanta cases
dcs                                                                             # Quantum case label
1                                                                               # No. of quanta defined
v                                                                               # Quantum label 1
I5 %4d                                                                          # Format quantum label 1
State vibrational quantum number                                                # Description quantum label 1
94601                                                                           # Total number of transitions
1                                                                               # No. of transition files
3588.16                                                                         # Maximum wavenumber (in cm-1)
 36159.87                                                                       # Higher energy with complete set of transitions (in cm-1)
 5000.00                                                                        # Maximum temperature of partition function
 1.00                                                                           # Step size of temperature
0                                                                               # Cooling function availability (1=yes, 0=no)
0.0700                                                                          # Default value of Lorentzian half-width for all lines (in cm-1/bar)
0.500                                                                           # Default value of temperature exponent for all lines
